%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{ATLASTileCalorimeterSystemAbdallah_etal2016} ATLAS Tile Calorimeter System(Abdallah, J. et al), Ferrer, A., Fiorini, L., Hernandez Jimenez, Y., Higon-Rodriguez, E., Ruiz-Martinez, A., et al. (2016). The Laser calibration of the ATLAS Tile Calorimeter during the LHC run 1. \textit{J. Instrum.}, \textit{11}, T10005--29pp.

\end{thebibliography}

\end{document}

