%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Solevi_etal2016} Solevi, P., Mu{\~n}oz, E., Solaz, C., Trovato, M., Dendooven, P., Gillam, J. E., et al. (2016). Performance of MACACO Compton telescope for ion-beam therapy monitoring: first test with proton beams. \textit{Phys. Med. Biol.}, \textit{61}(14), 5149--5165.

\end{thebibliography}

\end{document}

