%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Fernandes_etal2010} Fernandes, L. M. P., Freitas, E. D. C., Ball, M., Gomez-Cadenas, J. J., Monteiro, C. M. B., Yahlali, N., et al. (2010). Primary and secondary scintillation measurements in a Xenon Gas Proportional Scintillation Counter. \textit{J. Instrum.}, \textit{5}, P09006--15pp.

\end{thebibliography}

\end{document}

