%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Solevi_etal2015} Solevi, P., Magrin, G., Moro, D., \& Mayer, R. (2015). Monte Carlo study of microdosimetric diamond detectors. \textit{Phys. Med. Biol.}, \textit{60}(18), 7069--7083.

\end{thebibliography}

\end{document}

