%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Sorel2014} Sorel, M. (2014). Expected performance of an ideal liquid argon neutrino detector with enhanced sensitivity to scintillation light. \textit{J. Instrum.}, \textit{9}, P10002--25pp.

\end{thebibliography}

\end{document}

