%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{ATLASTileCalorimeterCommunityAbdallah_etal2013} ATLAS Tile Calorimeter Community(Abdallah, J. et al), Castillo Gimenez, V., Costelo, J., Ferrer, A., Fullana, E., Gonzalez, V., et al. (2013). The optical instrumentation of the ATLAS Tile Calorimeter. \textit{J. Instrum.}, \textit{8}, P01005--21pp.

\end{thebibliography}

\end{document}

