%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Garcia_etal2012} Garcia, A. R., Martinez, T., Cano-Ott, D., Castilla, J., Guerrero, C., Marin, J., et al. (2012). MONSTER: a time of flight spectrometer for beta-delayed neutron emission measurements. \textit{J. Instrum.}, \textit{7}, C05012--12pp.

\end{thebibliography}

\end{document}

